\subsection{Results timing nessr}

\begin{figure}
  \centering
  \includegraphics[height = 6.5in, width= 5in, angle = -90]{nessr.timing.plot.ps}
  \caption{Simulation Result from R. Ness}
\end{figure}

I used a two for-loops, looping once over each subset size for both
the glm model fit and "null" fit, and once over each of the three
replicates.  The code for generating the data was inside both loops,
so I generated data for each of the 11 * 2 * 3 = 66 fits. Compared to
the other simulations, I have a surprisingly low variance in timings.
